##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : BUG#<xxxx> <date disabled> <disabler> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################
read_many_rows_innodb    : Bug#11748886 2010-11-15 mattiasj report already exists
archive-big              : Bug#11817185 2011-03-10 Anitha Disabled since this leads to timeout on Solaris Sparc
ds_mrr-big @solaris      : Bug#14168107 2012-04-03 Hemant disabled new test added by Olav Sandstå,since this leads to timeout on Solaris on slow sparc servers
mysql_embedded_client_test	: Bug#13964673 2012-04-16 amitbha since most of the test cases are failing
mysql_client_test_embedded : Bug#16084066 2013-01-08 Disabled since this test is failing
ssl-big                  : Bug #18977126 MAIN.SSL-BIG FAILS WITH TIMEOUT Times out on weekly, disable it
explain_for_connection_rqg_json  : Bug#20697533 2015-03-20 erlend Fails several times each day on all platforms
explain_for_connection_rqg_trad : Bug#20697533 2015-03-20 erlend Fails several times each day on all platforms
events_time_zone         : percona disabled because the test is fundamentally unstable https://bugs.launchpad.net/percona-server/+bug/1616320
daemonize_opt : Bug#31335773 2020-05-12 Deepa Shutdown_report fails
