LIBRARY clrcompression.dll

EXPORTS
    crc32
    deflateInit2_
    deflate
    deflateEnd
    inflateInit2_
    inflate
    inflateEnd
    zlibCompileFlags 
    BrotliEncoderCompress
    BrotliEncoderCompressStream
    BrotliEncoderCreateInstance
    BrotliEncoderDestroyInstance
    BrotliEncoderHasMoreOutput
    BrotliEncoderIsFinished
    BrotliEncoderMaxCompressedSize
    BrotliEncoderSetParameter
    BrotliEncoderTakeOutput
    BrotliEncoderVersion
    BrotliDecoderCreateInstance
    BrotliDecoderDecompress
    BrotliDecoderDecompressStream
    BrotliDecoderDestroyInstance
    BrotliDecoderErrorString
    BrotliDecoderGetErrorCode
    BrotliDecoderHasMoreOutput
    BrotliDecoderIsFinished
    BrotliDecoderIsUsed
    BrotliDecoderSetParameter
    BrotliDecoderTakeOutput
    BrotliDecoderVersion
    BrotliGetDictionary
    BrotliSetDictionaryData